-- verif_nnir_cod.sql - NNIR distinct pe ACT/RUL/RUL_OBINV pentru un COD dat
-- Rulare: sqlplus -L -S MARIUSM_AUTO/<parola>@ROA_CENTRAL @verif_nnir_cod.sql <cod>
set pagesize 200 linesize 200 trimspool on feedback off
define v_cod = &1
prompt ==ACT==
select cod, an, luna, id_set, nnir from act where cod = &v_cod;
prompt ==RUL_NNIR_DISTINCT==
select an, luna, nnir, count(*) cnt from rul where cod = &v_cod group by an, luna, nnir;
prompt ==RUL_OBINV_NNIR_DISTINCT==
select an, luna, nnir, count(*) cnt from rul_obinv where cod = &v_cod group by an, luna, nnir;
exit;
